selog(1) selog(1)

NAME

selog − selective logging tool SYNOPSIS

selog [config] <category> <level> <message> ... DESCRIPTION Selog provides a shell command interface to the selog(3) library. It takes the following arguments:

config The first argument is an optional selog configuration string. Its presence is recognozed if it starts with “-”, “+”, or “@”. See selog(7) for details.

category

The selector category name of the message to be logged.

level The level of the message to be logged.

message

The remaining arguments are joined using spaces to produce the message that is to be logged. EXIT STATUS By default, selog exits with a status of zero, though this can be changed to n using a level setting of “fatal(n)”. You can make selog dump core using an “abort” level setting.

Selog exits with a status of 1 if there is a problem with the command line. If the config is invalid then a message is logged using the {log_config, ERROR} selector. If there are not enough arguments or if the level is invalid, then a message is logged using the {usage, FATAL} selector.

SEE ALSO

selog(3), selog(7) AUTHOR

Written by Tony Finch <dot@dotat.at> <fanf2@cam.ac.uk> at the University of Cambridge Computing Service. Source available from <http://dotat.at/prog/selog>